export default function RareIntro() {
  return (
    <section className="py-0">
      <div className="container-fluid">
        <div className="bg-gradient-to-br from-teal-600 to-teal-700 text-white p-8 lg:p-8 flex items-center">
          <div className="w-full">
            <h2 className="text-3xl font-bold text-white mb-6 leading-tight">
              Transforming Delays into Diagnoses
            </h2>
            <ul className="space-y-4">
              <li className="flex items-start gap-3">
                <div className="w-2 h-2 rounded-full mt-2 flex-shrink-0" style={{backgroundColor: '#faae31'}}></div>
                <span className="leading-relaxed text-justify">
                  There are over 7,000 identified rare diseases, many of which begin in childhood—and
                  nearly 80% have a genetic cause. Yet, the average time to diagnose a rare disorder is
                  still 4.8 years, with some cases taking up to 20 years.
                </span>
              </li>
              <li className="flex items-start gap-3">
                <div className="w-2 h-2 rounded-full mt-2 flex-shrink-0" style={{backgroundColor: '#faae31'}}></div>
                <span className="leading-relaxed text-justify">
                  At Operify Health, we leverage advanced Next Generation Sequencing (NGS) and proprietary
                  bioinformatics to deliver rapid, reliable insights—helping reduce the diagnostic journey
                  from years to days.
                </span>
              </li>
            </ul>
          </div>
        </div>
      </div>
    </section>
  );
}