export default function RareIntro() {
  return (
    <section className="mx-auto px-10 pt-12">
      <h1 className="text-4xl font-bold text-gray-700 text-left pb-2 mb-4">Rare Disorders</h1>
      <h2 className="text-2xl font-semibold text-gray-700 mb-4">Transforming Delays into Diagnoses</h2>
      <p className="text-gray-600 leading-relaxed text-base mb-4 text-justify">
        There are over 7,000 identified rare diseases, many of which begin in childhood—and
        nearly 80% have a genetic cause. Yet, the average time to diagnose a rare disorder is
        still 4.8 years, with some cases taking up to 20 years.
      </p>
      <p className="text-gray-600 leading-relaxed text-base text-justify">
        At Operify Health, we leverage advanced Next Generation Sequencing (NGS) and proprietary
        bioinformatics to deliver rapid, reliable insights—helping reduce the diagnostic journey
        from years to days.
      </p>
    </section>
  );
}