---
sidebar_position: 2
sidebar_custom_props:
  icon: TbExclamationCircle
---

# Troubleshooting


## Windows setup eslint prettier error: `CR` line breaks found

This is due to the linebreak characters of windows and the git configuration. Try running:
```
git config --global core.autocrlf false
```

Then delete the repository and clone it again.


## Yarn lock file changed and new files are created (`yarn.lock`, `.yarnrc.yml`, `.yarn`)

Maybe you are using yarn 3? Try installing [yarn classic](https://classic.yarnpkg.com/lang/en/)!


## Docker throws errors while setting up local environment

If by any chance you will run into problems with Docker, you should change the `docker-compose` to `docker compose` in `./infra/dev/Makefile` as `docker-compose` is old version
becoming slowly obsolete. (More info can be found [here](https://docs.docker.com/compose/migrate/))
